Founded in 1933, Izhevsk State Medical Academy is a non-profit public higher education institution located in the urban setting of the medium-sized city of Izhevsk (population range of 500,000-1,000,000 inhabitants), Udmurt Republic.  Officially accredited and/or recognized by the Ministry of Science and Higher Education of the Russian Federation, Izhevsk State Medical Academy (ISMA) is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution. Izhevsk State Medical Academy (ISMA) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 87 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades. International students are welcome to apply for enrollment. 