Established in 1926, Scripps College is a non-profit private higher education institution located in the suburban setting of the medium-sized town of Claremont (population range of 10,000-49,999 inhabitants), California.  Officially accredited and/or recognized by the WASC Senior College and University Commission, Scripps College  is a very small (EduListing enrollment range: 1,000-1,999 students) women only higher education institution. Scripps College offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 94 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 20-30% making this US higher education organization a very selective institution. International applicants are eligible to apply for enrollment. 