Established in 1911, Fort Lewis College is a non-profit public higher education institution located in the rural setting of the medium-sized town of Durango (population range of 10,000-49,999 inhabitants), Colorado.  Officially accredited and/or recognized by the Higher Learning Commission, Fort Lewis College (FLC) is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution. Fort Lewis College (FLC) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 109 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 90-100% making this US higher education organization a least selective institution. International applicants are eligible to apply for enrollment. 