Established in 1938, Guizhou Medical University is a non-profit public higher education institution located in the urban setting of the large city of Guiyang (population range of 1,000,000-5,000,000 inhabitants), Guizhou.  Officially accredited and/or recognized by the Department of Education, Guizhou Province, Guizhou Medical University  is a medium-sized (EduListing enrollment range: 8,000-8,999 students) coeducational higher education institution. Guizhou Medical University offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 