Established in 1976, Instituto Tecnológico de El Salto (Institute of Technology Falls) is a non-profit public higher education institution located in the medium-sized city of Victoria de Durango (population range of 500,000-1,000,000 inhabitants), Durango.  Officially accredited and/or recognized by the Secretaría de Educación Pública, Mexico (Secretariat of Public Education, Mexico), Instituto Tecnológico de El Salto (IT El Salto) is a coeducational higher education institution. Instituto Tecnológico de El Salto (IT El Salto) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 