Established in 1901, Dominican University is a non-profit private higher education institution located in the suburban setting of the medium-sized town of River Forest (population range of 10,000-49,999 inhabitants), Illinois.  Officially accredited and/or recognized by the Higher Learning Commission, Dominican University (Dominican) is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution formally affiliated with the Christian-Catholic religion. Dominican University (Dominican) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 119 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 60-70% making this US higher education organization a somewhat selective institution. International applicants are eligible to apply for enrollment. 