Founded in 1909, Irkutsk State Medical University is a non-profit public higher education institution located in the medium-sized city of Irkutsk (population range of 500,000-1,000,000 inhabitants), Irkutsk Oblast.  Officially accredited and/or recognized by the Ministry of Science and Higher Education of the Russian Federation, Irkutsk State Medical University (ISMU) is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution. Irkutsk State Medical University (ISMU) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 