Established in 1968, Chung Hwa University of Medical Technology is a  private higher education institution located in the suburban setting of the large city of Tainan City (population range of 1,000,000-5,000,000 inhabitants), Tainan.  Officially accredited and/or recognized by the Ministry of Education, Republic of China (Taiwan), Chung Hwa University of Medical Technology (CUMT) is a coeducational higher education institution. Chung Hwa University of Medical Technology (CUMT) offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. International applicants are eligible to apply for enrollment. 