Established in 1977, MGH Institute of Health Professions is a non-profit private higher education institution located in the urban setting of the medium-sized city of Boston (population range of 500,000-1,000,000 inhabitants), Massachusetts.  Officially accredited and/or recognized by the Commission on Institutions of Higher Education of the New England Association of Schools and Colleges, MGH Institute of Health Professions (MGHIHP) is a small (EduListing enrollment range: 2,000-2,999 students) coeducational higher education institution. MGH Institute of Health Professions (MGHIHP) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 43 years old higher-education institution has a selective admission policy based on students' past academic record and grades.  The admission rate range is 50-60% making this US higher education organization a averagely selective institution. 