Founded in 1978, Nihon Bunka University is a  private higher education institution located in the medium-sized city of Hachioji (population range of 500,000-1,000,000 inhabitants), Tokyo.  Officially accredited and/or recognized by the Ministry of Education, Culture, Sports, Science and Technology, Japan, Nihon Bunka University  is a coeducational higher education institution. Nihon Bunka University offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 