Established in 2006, Nahda University is a for-profit private higher education institution located in the urban setting of the metropolis of Cairo (population range of over 5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Higher Education, Egypt, Nahda University (NUB) is a small (EduListing enrollment range: 4,000-4,999 students) coeducational higher education institution. Nahda University (NUB) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 14 years old higher-education institution has a selective admission policy based on entrance examinations. International applicants are eligible to apply for enrollment. 