Founded in 2002, International University is a  private higher education institution located in the urban setting of the large city of Phnom Penh (population range of 1,000,000-5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Education, Youth and Sports, Cambodia, International University (IU) is a coeducational higher education institution. International University (IU) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 