Established in 1990, Armenian Medical Institute is a  private higher education institution located in the large city of Yerevan (population range of 1,000,000-5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Education, Science, Culture and Sport of the Republic of Armenia, Armenian Medical Institute (AMI) is a coeducational higher education institution. Armenian Medical Institute (AMI) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 