Established in 1989, United States International University Africa is a non-profit private higher education institution located in the urban setting of the large city of Nairobi (population range of 1,000,000-5,000,000 inhabitants).  Officially accredited and/or recognized by the WASC Senior College and University Commission, United States International University Africa (USIU-Africa) is a medium-sized (EduListing enrollment range: 7,000-7,999 students) coeducational higher education institution. United States International University Africa (USIU-Africa) offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 31 years old higher-education institution has a selective admission policy based on students' past academic record and grades.  The admission rate range is 60-70% making this Kenyan higher education organization a somewhat selective institution. International applicants are eligible to apply for enrollment. 