Established in 1954, Muban Chombueng Rajabhat University is a non-profit public higher education institution located in the medium-sized town of Ratchaburi (population range of 10,000-49,999 inhabitants).  Officially accredited and/or recognized by the Ministry of Higher Education, Science, Research and Innovation, Thailand, Muban Chombueng Rajabhat University (MCRU) is a coeducational higher education institution. Muban Chombueng Rajabhat University (MCRU) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 