Founded in 1874, Rose-Hulman Institute of Technology is a non-profit private higher education institution located in the urban setting of the large town of Terre Haute (population range of 50,000-249,999 inhabitants), Indiana.  Officially accredited and/or recognized by the Higher Learning Commission, Rose-Hulman Institute of Technology (RHIT) is a small (EduListing enrollment range: 2,000-2,999 students) coeducational higher education institution. Rose-Hulman Institute of Technology (RHIT) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 146 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 50-60% making this US higher education organization a averagely selective institution. International students are welcome to apply for enrollment. 