Founded in 1962, Universitas Nusa Cendana (Nusa Cendana University) is a non-profit public higher education institution located in the urban setting of the small city of Kupang (population range of 250,000-499,999 inhabitants), East Nusa Tenggara.  Officially accredited and/or recognized by the Kementerian Riset dan Teknologi/Badan Riset dan Inovasi Nasional, Republik Indonesia (Ministry of Research and Technology/National Research and Innovation Agency of Republic Indonesia), Universitas Nusa Cendana (UNDANA) is a large (EduListing enrollment range: 10,000-14,999 students) coeducational higher education institution. Universitas Nusa Cendana (UNDANA) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 57 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 10-20% making this Indonesian higher education organization a most selective institution. International students are welcome to apply for enrollment. 