Established in 2007, Universidade Óscar Ribas (Oscar Ribas University) is a  private higher education institution located in the large city of Luanda (population range of 1,000,000-5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministério do Ensino Superior, Ciência, Tecnologia e Inovação, Angola (Ministry of Higher Education, Science, Technology and Innovation, Angola), Universidade Óscar Ribas (UOR) is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution. Universidade Óscar Ribas (UOR) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 