Founded in 1981, Universitas Tabanan (University of Tabanan) is a  private higher education institution located in the small city of Tabanan (population range of 250,000-499,999 inhabitants), Bali.  Officially accredited and/or recognized by the Kementerian Riset dan Teknologi/Badan Riset dan Inovasi Nasional, Republik Indonesia (Ministry of Research and Technology/National Research and Innovation Agency of Republic Indonesia), Universitas Tabanan  is a very small (EduListing enrollment range: 1,000-1,999 students) coeducational higher education institution. Universitas Tabanan offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 