Established in 1983, Islamic Azad University, Kerman is a  private higher education institution located in the medium-sized city of Kerman (population range of 500,000-1,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Science Research and Technology, Iran, Islamic Azad University, Kerman  is a coeducational higher education institution formally affiliated with the Islamic religion. Islamic Azad University, Kerman offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 37 years old higher-education institution has a selective admission policy based on entrance examinations. 