Founded in 1873, William Penn University is a non-profit private higher education institution located in the rural setting of the medium-sized town of Oskaloosa (population range of 10,000-49,999 inhabitants), Iowa.  Officially accredited and/or recognized by the Higher Learning Commission, William Penn University  is a small (EduListing enrollment range: 2,000-2,999 students) coeducational higher education institution formally affiliated with the Christian-Protestant religion. William Penn University offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 147 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 50-60% making this US higher education organization a averagely selective institution. International students are welcome to apply for enrollment. 