Established in 1979, Al Mustafa International University is a non-profit public higher education institution located in the urban setting of the large city of Qom (population range of 1,000,000-5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Science Research and Technology, Iran, Al Mustafa International University (MIU) is a medium-sized (EduListing enrollment range: 9,000-9,999 students) coeducational higher education institution formally affiliated with the Islamic religion. Al Mustafa International University (MIU) offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 41 years old higher-education institution has a selective admission policy based on entrance examinations.  The admission rate range is 0-10% making this Iranian higher education organization a most selective institution. International applicants are eligible to apply for enrollment. 