Established in 1885, Goucher College is a non-profit private higher education institution located in the suburban setting of the large town of Towson (population range of 50,000-249,999 inhabitants), Maryland.  Officially accredited and/or recognized by the Middle States Commission on Higher Education, Goucher College  is a small (EduListing enrollment range: 2,000-2,999 students) coeducational higher education institution. Goucher College offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 135 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 70-80% making this US higher education organization a somewhat selective institution. International applicants are eligible to apply for enrollment. 