Founded in 1841, Samford University is a non-profit private higher education institution located in the suburban setting of the large town of Birmingham (population range of 50,000-249,999 inhabitants), Alabama.  Officially accredited and/or recognized by the Southern Association of Colleges and Schools Commission on Colleges, Samford University (SU) is a small (EduListing enrollment range: 5,000-5,999 students) coeducational higher education institution formally affiliated with the Christian-Baptist religion. Samford University (SU) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 179 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 50-60% making this US higher education organization a averagely selective institution. International students are welcome to apply for enrollment. 