Established in 1860, Simpson College is a non-profit private higher education institution located in the suburban setting of the medium-sized town of Indianola (population range of 10,000-49,999 inhabitants), Iowa.  Officially accredited and/or recognized by the Higher Learning Commission, Simpson College  is a very small (EduListing enrollment range: 1,000-1,999 students) coeducational higher education institution formally affiliated with the Christian-Methodist religion. Simpson College offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 160 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 80-90% making this US higher education organization a least selective institution. International applicants are eligible to apply for enrollment. 