<table class="table table-sm table-bordered" id="experimental-properties"><thead><tr><th class="head-medium">Property</th><th class="head-large">Value</th><th>Source</th></tr></thead><tbody><tr><td>melting point (°C)</td><td>205 °C</td><td>PhysProp</td></tr><tr><td>water solubility</td><td>5.05E+005 mg/L (at 25 °C)</td><td>YALKOWSKY,SH &amp; DANNENFELSER,RM (1992)</td></tr><tr><td>logP</td><td>-2.95</td><td>HANSCH,C ET AL. (1995)</td></tr><tr><td>pKa</td><td>4.43 (at 25 °C)</td><td>KORTUM,G ET AL (1961)</td></tr></tbody></table>