Founded in 1886, Saint Petersburg State Electrotechnical University is a non-profit public higher education institution located in the urban setting of the metropolis of Saint Petersburg (population range of over 5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Science and Higher Education of the Russian Federation, Saint Petersburg State Electrotechnical University (ETU "LETI") is a medium-sized (EduListing enrollment range: 9,000-9,999 students) coeducational higher education institution. Saint Petersburg State Electrotechnical University (ETU "LETI") offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 134 years old higher-education institution has a selective admission policy based on entrance examinations.  The admission rate range is 10-20% making this Russian higher education organization a most selective institution. International students are welcome to apply for enrollment. 