Founded in 1904, Politechnika Gdanska (Gdansk University of Technology) is a non-profit public higher education institution located in the medium-sized city of Gdansk (population range of 500,000-1,000,000 inhabitants), Pomeranian Voivodeship.  Officially accredited and/or recognized by the Ministerstwo Nauki i Szkolnictwa Wyzszego, Polsce (Ministry of Science and Higher Education, Poland), Politechnika Gdanska (PG/GUT) is a large (EduListing enrollment range: 20,000-24,999 students) coeducational higher education institution. Politechnika Gdanska (PG/GUT) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 