Founded in 1946, Truett McConnell University is a non-profit private higher education institution located in the rural setting of the village of Cleveland (population range of under 2,500 inhabitants), Georgia.  Officially accredited and/or recognized by the Southern Association of Colleges and Schools Commission on Colleges, Truett McConnell University  is a small (EduListing enrollment range: 2,000-2,999 students) coeducational higher education institution formally affiliated with the Christian-Baptist religion. Truett McConnell University offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 74 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 90-100% making this US higher education organization a least selective institution. International students are welcome to apply for enrollment. 