Established in 1915, Webster University is a non-profit private higher education institution located in the suburban setting of the small city of St. Louis (population range of 250,000-499,999 inhabitants), Missouri.  Officially accredited and/or recognized by the Higher Learning Commission, Webster University  is a large (EduListing enrollment range: 20,000-24,999 students) coeducational higher education institution. Webster University offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 105 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 70-80% making this US higher education organization a somewhat selective institution. International applicants are eligible to apply for enrollment. 