Founded in 2006, Ghana Technology University College is a  private higher education institution located in the urban setting of the large city of Accra North (population range of 1,000,000-5,000,000 inhabitants), Greater Accra. This institution has also branch campuses in the following location(s): Kumasi, Takoradi, Koforidua, Ho. Officially accredited and/or recognized by the National Accreditation Board, Ghana (National Accreditation Board, Ghana), Ghana Technology University College (GTUC) is a medium-sized (EduListing enrollment range: 8,000-8,999 students) coeducational higher education institution. Ghana Technology University College (GTUC) offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 14 years old higher-education institution has a selective admission policy based on students' past academic record and grades.  The admission rate range is 80-90% making this Ghanaian higher education organization a least selective institution. International students are welcome to apply for enrollment. 