Established in 1979, Universidad de Cádiz (University of Cádiz) is a non-profit public higher education institution located in the urban setting of the large town of Cádiz (population range of 50,000-249,999 inhabitants), Andalucia. This institution has also branch campuses in the following location(s): Puerto Real, Jerez, Algeciras. Officially accredited and/or recognized by the Ministerio de Educación y Formación Profesional, España (Ministry of Education and Vocational Training, Spain), Universidad de Cádiz (UCA) is a large (EduListing enrollment range: 15,000-19,999 students) coeducational higher education institution. Universidad de Cádiz (UCA) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 40 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 80-90% making this Spanish higher education organization a least selective institution. International applicants are eligible to apply for enrollment. 