Founded in 1826, Mississippi College is a non-profit private higher education institution located in the suburban setting of the medium-sized town of Clinton (population range of 10,000-49,999 inhabitants), Mississippi. This institution has also branch campuses in the following location(s): Flowood. Officially accredited and/or recognized by the Southern Association of Colleges and Schools Commission on Colleges, Mississippi College (MC) is a small (EduListing enrollment range: 5,000-5,999 students) coeducational higher education institution formally affiliated with the Christian-Baptist religion. Mississippi College (MC) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 194 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 60-70% making this US higher education organization a somewhat selective institution. International students are welcome to apply for enrollment. 