Founded in 2002, TIME Université (TIME University) is a  private higher education institution located in the large city of Tunis (population range of 1,000,000-5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministère de l'Enseignement Supérieur et de la Recherche Scientifique, Tunisie (Ministry of Higher Education and  Scientific Research, Tunisia), TIME Université (TU) is a coeducational higher education institution. TIME Université (TU) offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees, master degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 