Founded in 1994, Universidad Internacional, Ciudad de Mexico (International University, Mexico City) is a  private higher education institution located in the metropolis of Mexico City (population range of over 5,000,000 inhabitants).  Officially accredited and/or recognized by the Secretaría de Educación Pública, Mexico (Secretariat of Public Education, Mexico), Universidad Internacional, Ciudad de Mexico (UNINTER) is a coeducational higher education institution. Universidad Internacional, Ciudad de Mexico (UNINTER) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 