Founded in 1967, Kanazawa Seiryo University is a  private higher education institution located in the small city of Kanazawa (population range of 250,000-499,999 inhabitants), Ishikawa.  Officially accredited and/or recognized by the Ministry of Education, Culture, Sports, Science and Technology, Japan, Kanazawa Seiryo University  is a coeducational higher education institution. Kanazawa Seiryo University offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. International students are welcome to apply for enrollment. 