Founded in 1963, Universitas Hindu Indonesia (Hindu University of Indonesia) is a  private higher education institution located in the medium-sized city of Denpasar (population range of 500,000-1,000,000 inhabitants), Bali.  Officially accredited and/or recognized by the Kementerian Riset dan Teknologi/Badan Riset dan Inovasi Nasional, Republik Indonesia (Ministry of Research and Technology/National Research and Innovation Agency of Republic Indonesia), Universitas Hindu Indonesia  is a very small (EduListing enrollment range: 500-999 students) coeducational higher education institution. Universitas Hindu Indonesia offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 