Founded in 1951, Weifang Medical University is a non-profit public higher education institution located in the urban setting of the metropolis of Weifang (population range of over 5,000,000 inhabitants), Shandong.  Officially accredited and/or recognized by the Department of Education, Shandong Province, Weifang Medical University (WMU) is a large (EduListing enrollment range: 10,000-14,999 students) coeducational higher education institution. Weifang Medical University (WMU) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 