<table class="table table-sm table-bordered" id="experimental-properties"><thead><tr><th class="head-medium">Property</th><th class="head-large">Value</th><th>Source</th></tr></thead><tbody><tr><td>melting point (°C)</td><td>214-218 °C</td><td><span class="not-available">Not Available</span></td></tr><tr><td>water solubility</td><td>58.6 mg/L (at 24 °C)</td><td>YALKOWSKY,SH &amp; DANNENFELSER,RM (1992)</td></tr><tr><td>logP</td><td>4.90</td><td>HANSCH,C ET AL. (1995)</td></tr><tr><td>logS</td><td>-3.66</td><td>ADME Research, USCD</td></tr><tr><td>Caco2 permeability</td><td>-4.67</td><td>ADME Research, USCD</td></tr><tr><td>pKa</td><td>10.4</td><td>SANGSTER (1994)</td></tr></tbody></table>