Founded in 2002, Sveucilite u Zadru (University of Zadar) is a non-profit public higher education institution located in the urban setting of the large town of Zadar (population range of 50,000-249,999 inhabitants).  Officially accredited and/or recognized by the Agencija za znanost i visoko obrazovanje (Agency for Science and Higher Education), Sveucilite u Zadru (UNIZD) is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution. Sveucilite u Zadru (UNIZD) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 18 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 80-90% making this Croatian higher education organization a least selective institution. International students are welcome to apply for enrollment. 