Founded in 1964, Nova Southeastern University is a non-profit private higher education institution located in the suburban setting of the large town of Fort Lauderdale (population range of 50,000-249,999 inhabitants), Florida. This institution has also branch campuses in the following location(s): Miami, Orlando, Ft. Myers, Tampa, Palm Beach, Jacksonville, Nassau. Officially accredited and/or recognized by the Southern Association of Colleges and Schools Commission on Colleges, Nova Southeastern University  is a very large (EduListing enrollment range: 30,000-34,999 students) coeducational higher education institution. Nova Southeastern University offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 56 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 40-50% making this US higher education organization a averagely selective institution. International students are welcome to apply for enrollment. 