Founded in 1907, North-Western State Medical University is a non-profit public higher education institution located in the urban setting of the metropolis of Saint Petersburg (population range of over 5,000,000 inhabitants).  Officially accredited and/or recognized by the Ministry of Health of the Russian Federation, North-Western State Medical University  is a small (EduListing enrollment range: 5,000-5,999 students) coeducational higher education institution. North-Western State Medical University offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees, master degrees, doctorate degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 