Established in 1996, Poole Gakuin University is a  private higher education institution located in the medium-sized city of Sakai (population range of 500,000-1,000,000 inhabitants), Osaka.  Officially accredited and/or recognized by the Ministry of Education, Culture, Sports, Science and Technology, Japan, Poole Gakuin University  is a coeducational higher education institution. Poole Gakuin University offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. International applicants are eligible to apply for enrollment. 