Established in 2004, Escola Superior de Enfermagem de Coimbra (Higher School of Nursing of Coimbra) is a non-profit public higher education institution located in the large town of Coimbra (population range of 50,000-249,999 inhabitants).  Officially accredited and/or recognized by the Ministério da Ciência, Tecnologia e Ensino Superior, Portugal (Ministry of Science, Technology and Higher Education, Portugal), Escola Superior de Enfermagem de Coimbra (ESEBB) is a coeducational higher education institution. Escola Superior de Enfermagem de Coimbra (ESEBB) offers courses and programs leading to officially recognized higher education degrees such as bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 