Founded in 1980, Universitas Flores (Flores University) is a  private higher education institution located in the large town of Ende (population range of 50,000-249,999 inhabitants), East Nusa Tenggara.  Officially accredited and/or recognized by the Kementerian Riset dan Teknologi/Badan Riset dan Inovasi Nasional, Republik Indonesia (Ministry of Research and Technology/National Research and Innovation Agency of Republic Indonesia), Universitas Flores (UNIFLOR) is a small (EduListing enrollment range: 5,000-5,999 students) coeducational higher education institution. Universitas Flores (UNIFLOR) offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 