Founded in 1981, Universitas Abdurachman Saleh (Abdurachman Saleh University) is a  private higher education institution located in the medium-sized city of Situbondo (population range of 500,000-1,000,000 inhabitants), East Java.  Officially accredited and/or recognized by the Kementerian Riset dan Teknologi/Badan Riset dan Inovasi Nasional, Republik Indonesia (Ministry of Research and Technology/National Research and Innovation Agency of Republic Indonesia), Universitas Abdurachman Saleh  is a small (EduListing enrollment range: 3,000-3,999 students) coeducational higher education institution. Universitas Abdurachman Saleh offers courses and programs leading to officially recognized higher education degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. 