Founded in 1946, Florida College is a non-profit private higher education institution located in the suburban setting of the medium-sized town of Temple Terrace (population range of 10,000-49,999 inhabitants), Florida.  Officially accredited and/or recognized by the Southern Association of Colleges and Schools Commission on Colleges, Florida College  is a very small (EduListing enrollment range: 500-999 students) coeducational higher education institution formally affiliated with the Christian-Restorationist religion. Florida College offers courses and programs leading to officially recognized higher education degrees such as pre-bachelor degrees (i.e. certificates, diplomas, associate or foundation degrees), bachelor degrees in several areas of study. See the EduListing degree levels and areas of study matrix below for further details. This 74 years old higher-education institution has a selective admission policy based on entrance examinations and students' past academic record and grades.  The admission rate range is 70-80% making this US higher education organization a somewhat selective institution. International students are welcome to apply for enrollment. 